-- phpMyAdmin SQL Dump
-- version 4.6.5.2
-- https://www.phpmyadmin.net/
--
-- Host: se.dev.webone.pl
-- Generation Time: Feb 02, 2017 at 08:17 PM
-- Server version: 5.5.53-MariaDB
-- PHP Version: 5.6.27

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Database: `SES_USERS2`
--

-- --------------------------------------------------------

--
-- Table structure for table `Rozdzielcza_test_bzyk_przylacza_HIST`
--

CREATE TABLE `Rozdzielcza_test_bzyk_przylacza_HIST` (
  `ID` int(11) NOT NULL,
  `ID_USERS2` int(11) NOT NULL,
  `_action_time` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
  `_action_type` varchar(16) DEFAULT NULL,
  `Punkt_ID` varchar(255) DEFAULT 'N/S;',
  `the_geom` varchar(255) DEFAULT 'N/S;',
  `A_RECORD_CREATE_DATE` varchar(255) DEFAULT 'N/S;',
  `A_RECORD_CREATE_AUTHOR` varchar(255) DEFAULT 'N/S;',
  `SYNC_SQIX_STATUS` varchar(255) DEFAULT 'N/S;',
  `A_RECORD_UPDATE_DATE` varchar(255) DEFAULT 'N/S;',
  `A_RECORD_UPDATE_AUTHOR` varchar(255) DEFAULT 'N/S;',
  `L_APPOITMENT_DATE` varchar(255) DEFAULT 'N/S;',
  `L_APPOITMENT_USER` varchar(255) DEFAULT 'N/S;',
  `L_APPOITMENT_PERIOD` varchar(255) DEFAULT 'N/S;',
  `L_APPOITMENT_INFO` varchar(255) DEFAULT 'N/S;',
  `L_APPOITMENT_TYPE` varchar(255) DEFAULT 'N/S;',
  `A_STATUS` varchar(255) DEFAULT 'N/S;',
  `A_STATUS_INFO` varchar(255) DEFAULT 'N/S;',
  `A_ADM_COMPANY` varchar(255) DEFAULT 'N/S;',
  `A_CLASSIFIED` varchar(255) DEFAULT 'N/S;'
) ENGINE=MyISAM DEFAULT CHARSET=latin2;

--
-- Indexes for dumped tables
--

--
-- Indexes for table `Rozdzielcza_test_bzyk_przylacza_HIST`
--
ALTER TABLE `Rozdzielcza_test_bzyk_przylacza_HIST`
  ADD PRIMARY KEY (`ID`),
  ADD KEY `ID_USERS2` (`ID_USERS2`);

--
-- AUTO_INCREMENT for dumped tables
--

--
-- AUTO_INCREMENT for table `Rozdzielcza_test_bzyk_przylacza_HIST`
--
ALTER TABLE `Rozdzielcza_test_bzyk_przylacza_HIST`
  MODIFY `ID` int(11) NOT NULL AUTO_INCREMENT;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
